-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

1000

2000

3000

4000

5000

6000

Nunm(Pred) - Src 1 vs Lxy (cm)^{hNunmPred1}_{Entries 100}

Mean 0.0769 RMS 0.07617 Underflow 0 Overflow 0

Nunm(Pred) - Src 1 vs Lxy (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 1

10

210

3 10

410 Nunm(Data) vs Lxy (cm)^{hNunmData}_{Entries 100000}

Mean 0.07863 RMS 0.07763 Underflow 0 Overflow 1719 hNunmPred1 Entries 100 Mean 0.0769 RMS 0.07617

Overflow 0

Nunm(Data) vs Lxy (cm)