hPar Entries 1000 Mean 1.494 RMS 0.2844 Underflow 0 Overflow 0

0.5 1 1.5 2 2.5 3 0

20

40

60

80

100 tau(Bs): Fit Results

hErr Entries 1000 Mean 0.2517 RMS 0.0864 Underflow 0 Overflow 0

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 10 20 30 40 50 60 70 80 tau(Bs): Fit Error