9.5 9.6 9.7 9.8 9.9 10 10.1 10.2 10.3 10.4 10.5 0

20

40

60

80

100

120 dms : Fit Value hFitPar3 Entries 1000 Mean 9.998 RMS 0.08437 Underflow 0 Overflow 0 dms : Fit Value

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2 0 20 40 60 80 100 120 140 160 dms : Fit Error hFitErr3 Entries 1000 Mean 0.07479 RMS 0.01558 Underflow 0 Overflow 3 dms : Fit Error