-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

100

200

300

400

500 3 10× Nunm(Pred) - Src 3 vs Lxy (cm)^{hNunmPred3}_{Entries 100}

Mean 0.0705 RMS 0.0754 Underflow 0 Overflow 0

Nunm(Pred) - Src 3 vs Lxy (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

50

100

150

200

250

3 10× Nmix(Data) vs Lxy (cm)^{hNmixData}_{Entries 2052237}

Mean 0.08459 RMS 0.08983 Underflow 0 Overflow 7.516e+04

Nmix(Data) vs Lxy (cm)