hPar Entries 1000 Mean 10.25 RMS 0.3114 Underflow 1 Overflow 6

9 9.5 10 10.5 11 11.5 12 0

20

40

60

80

100 dms: Fit Results

hErr Entries 1000 Mean 0.05043 RMS 0.01717 Underflow 0 Overflow 4

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0

20

40

60

80

100 dms: Fit Error