-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 500 1000

1500

2000

2500

3000

3500

4000

4500

Nunm(Data) vs Lxy (cm)^{hNunmData}_{Entries 53783}

Mean 0.0735 RMS 0.07884 Underflow 0 Overflow 1055

Nunm(Data) vs Lxy (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 500

1000

1500

2000

2500

3000

3500

Nmix(Data) vs Lxy (cm)^{hNmixData}_{Entries 46217}

Mean 0.07899 RMS 0.08483 Underflow 0 Overflow 1323

Nmix(Data) vs Lxy (cm)