-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100

120

3 10× Nunm(Pred) - Src 3 vs ct0 (cm)^{hNunmPred3}_{Entries 100}

Mean 0.03676 RMS 0.04016 Underflow 0 Overflow 0

Nunm(Pred) - Src 3 vs ct0 (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10000

20000

30000

40000

50000

60000

Nmix(Data) vs ct0 (cm)^{hNmixData}_{Entries 410364}

Mean 0.04869 RMS 0.05183 Underflow 0 Overflow 71

Nmix(Data) vs ct0 (cm)