-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02

K-conv

> - Input smΔ <Fit

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02

R-conv

-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2

K&R-conv

<Fit>-Inp / Err on Mean