0 1000 2000 3000 4000 5000 6000

K-conv

-0.05

0

0.05

) Gain/Loss wrt logL-Lxy sτ RMS(

0 1000 2000 3000 4000 5000 6000

R-conv

-0.05

0

0.05

0 1000 2000 3000 4000 5000 6000

K&R-conv

-0.05

0

0.05

RMS(fit)/RMS(logL-Lxy) - 1