hPar Entries 10 Mean 0.003286 RMS 0.001911 Underflow 0 Overflow 0

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0

0.5

1

1.5

2

2.5

3 p1Eff(Bs): Fit Results

hErr Entries 10 Mean 0.003552 RMS 0.002275 Underflow 0 Overflow 0

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0

0.5

1

1.5

2

2.5

3 p1Eff(Bs): Fit Error