-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 500 1000

1500

2000

2500

3000

3500

4000

Nunm(Data) vs Lxy (cm)^{hNunmData}_{Entries 28327}

Mean 0.08108 RMS 0.07736 Underflow 0 Overflow 470

Nunm(Data) vs Lxy (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

500

1000

1500

2000

2500

3000

Nmix(Data) vs Lxy (cm)^{hNmixData}_{Entries 21673}

Mean 0.09382 RMS 0.09273 Underflow 0 Overflow 867

Nmix(Data) vs Lxy (cm)