hAmp Entries 100 Mean 1.071 RMS 0.1943 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

2

4

6

8

10 Fitted A at Max hDms_{Entries 100}

Mean 10.33 RMS 0.3649 Underflow 0 Overflow 0

5 6 7 8 9 10 11 12 13 14 15 0

5

10

15

20

25 hDms Entries 100

dms at Max

hErr

Entries 100 Mean 0.2397 RMS 0.06773 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

5

10

15

20

25

30

Error on Fitted dms hSig_{Entries 100}

Mean 1.265 RMS 0.2432 Underflow 0 Overflow 0

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 2 4 6 8 10 12 14 16 18 20 22 hSig Entries 100

Sigma of dms Distr