Mean 10.32 RMS 1.337 / ndf

2χ 0.4534 / 6 Prob 0.9984 Constant 0.16±

1.05 Mean 0.23±

10.29 Sigma 0.210±

1.231

5 6 7 8 9 10 11 12 13 14 15

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 Ave(A) vs dms