hPar Entries 100 Mean 0.2057 RMS 0.2646 Underflow 0 Overflow 0

-1 -0.5 0 0.5 1 1.5 2 2.5 0

2

4

6

8

10

12 A(Bs): Fit Results

hErr Entries 100 Mean 0.2523 RMS 0.005406 Underflow 0 Overflow 0

0.22 0.23 0.24 0.25 0.26 0.27 0.28 0.29 0.3 0

2

4

6

8

10

12 A(Bs): Fit Error