-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 2000

4000

6000

8000

10000

12000

14000

16000

Nunm(Pred) - Src 3 vs VPDL (cm)^{hNunmPred3}_{Entries 100}

Mean 0.05912 RMS 0.05805 Underflow 0 Overflow 0

Nunm(Pred) - Src 3 vs VPDL (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

2000

4000

6000

8000

10000

12000

Nmix(Pred) - Src 3 vs VPDL (cm)^{hNmixPred3}_{Entries 100}

Mean 0.06538 RMS 0.06467 Underflow 0 Overflow 0

Nmix(Pred) - Src 3 vs VPDL (cm)