Mean 19.71 RMS 2.159 / ndf

2χ 0.107 / 10 Prob 1 Constant 0.25±

1.08 Mean 0.61±

19.59 Sigma 0.573±

2.135

12 14 16 18 20 22 24 26

-0.5

0

0.5

1

1.5 Ave(A) vs dms