-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Asym(Data) vs VPDL (cm)^{hAsymData}_{Entries 101}

Mean 0.1504 RMS 0.1524 Underflow -0.007299 Overflow 0

Asym(Data) vs VPDL (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 Asym(Pred) - Src 1 vs VPDL (cm)^{hAsymPred1}_{Entries 100}

Mean 0.1157 RMS 0.1439 Underflow 0 Overflow 0

Asym(Pred) - Src 1 vs VPDL (cm)