Lxy: 2-Gaus Entries 500000 Mean 0.001462 RMS 0.018 Underflow 0 Overflow 0

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

210

310

410

Smear - True : All Events - Lxy^{Lxy: 1-Gaus}_{Entries 500000}

Mean 0.0001644 RMS 0.004407 Underflow 0 Overflow 0

Lxy: 1-Gaus Entries 500000

VPDL: 2-Gaus Entries 500000 Mean 0.0011 RMS 0.01355 Underflow 1262 Overflow 1360

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

210

310

410

510 Smear - True : All Events - VPDL^{VPDL: 1-Gaus}_{Entries 500000}

Mean 0.0001814 RMS 0.004113 Underflow 198 Overflow 207

VPDL: 1-Gaus Entries 500000