hPt Entries 125012 Mean 4.99 RMS 3.103

0 5 10 15 20 25 30 35 40 45 50 0

2000

4000

6000

8000

10000

Bs-bar: Pt (GeV)

hKf Entries 125012 Mean 0.881 RMS 0.2418

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1000

2000

3000

4000

5000

K-Factor: All Pt