DLerr Entries 9700 Mean 0.004003 RMS 0.001803

0 0.002 0.004 0.006 0.008 0.01 0.012 0.014 0.016 0.018 0.02 0

200

400

600

800

1000

1200

Lxy(Bs) Error (cm) -- All Bs candidates