-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

2000

4000

6000

8000

10000

Smear - True : Source - 2 - Tag^{hSm_Tr_2_4}_{Entries 9990}

Mean 0 RMS 0 Underflow 0 Overflow 0

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 100 200 300 400 500 600 700 800 Smear - True : Source - 2 - VPDL^{hSm_Tr_2_6}_{Entries 9990}

Mean 0.0001312 RMS 0.009334 Underflow 0 Overflow 0

Smear - True : Source - 2 - VPDL