-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

1000

2000

3000

4000

5000

6000

VPDL-true : Source - 0 - ^{VPDL-true_0_}_{Entries 59940}

Mean 0.05049 RMS 0.05127 Underflow 0 Overflow 30

VPDL-true : Source - 0 -

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

1000

2000

3000

4000

5000

VPDL-smear : Source - 0 - ^{VPDL-smear_0_}_{Entries 59940}

Mean 0.05051 RMS 0.05149 Underflow 4 Overflow 31

VPDL-smear : Source - 0 -

0 0.01 0.02 0.03 0.04 0.05 0.06 0

5000

10000

15000

20000

25000

sigma(VPDL) : Source - 0 - ^{VPDLerr_0_}_{Entries 59940}

Mean 0.002715 RMS 0.002107 Underflow 0 Overflow 38

sigma(VPDL) : Source - 0 -