0 0.5 1 1.5 2 2.5 3 0

2000

4000

6000

8000

10000

12000

N(unm) vs t0(true) (ps) : Source 0^{hNvt0_true_unm_0}_{Entries 301195}

Mean 1.032 RMS 0.825 Underflow 0 Overflow 3.51e+04

N(unm) vs t0(true) (ps) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 0^{hNvlam_true_unm_0}_{Entries 301195}

Mean 0.03236 RMS 0.0253 Underflow 0 Overflow 4.619e+04

N(unm) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 1000

2000

3000

4000

5000

6000

7000

8000

N(unm) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 0^{hNvlam_tag_unm_0}_{Entries 300256}

Mean 0.03263 RMS 0.02508 Underflow 0 Overflow 4.616e+04

N(unm) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_noK_unm_0}_{Entries 301195}

Mean 0.03339 RMS 0.02579 Underflow 0 Overflow 5.881e+04

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

1000

2000

3000

4000

5000

6000

7000

N(unm) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 0^{hNvlam_Lm_unm_0}_{Entries 301195}

Mean 0.03251 RMS 0.02533 Underflow 1310 Overflow 4.634e+04

N(unm) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

1000

2000

3000

4000

5000

N(unm) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 0^{hNvlam_meas_unm_0}_{Entries 300256}

Mean 0.03388 RMS 0.02557 Underflow 1361 Overflow 5.89e+04

N(unm) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 0