0 0.5 1 1.5 2 2.5 3 0

1000

2000

3000

4000

5000

6000

N(unm) vs t0(true) (ps) : Source 1^{hNvt0_true_unm_1}_{Entries 238595}

Mean 0.9882 RMS 0.7714 Underflow 0 Overflow 1.146e+04

N(unm) vs t0(true) (ps) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 500 1000

1500

2000

2500

3000

3500

4000

4500

N(unm) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1^{hNvlam_true_unm_1}_{Entries 238595}

Mean 0.03399 RMS 0.02494 Underflow 0 Overflow 2.829e+04

N(unm) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

500

1000

1500

2000

2500

3000

N(unm) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1^{hNvlam_tag_unm_1}_{Entries 185562}

Mean 0.03496 RMS 0.02537 Underflow 0 Overflow 3.303e+04

N(unm) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

500 1000

1500

2000

2500

3000

3500

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_noK_unm_1}_{Entries 238595}

Mean 0.03687 RMS 0.02582 Underflow 0 Overflow 5.052e+04

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 500 1000

1500

2000

2500

3000

3500

4000

N(unm) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1^{hNvlam_Lm_unm_1}_{Entries 238595}

Mean 0.03409 RMS 0.02501 Underflow 610 Overflow 2.833e+04

N(unm) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

N(unm) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1^{hNvlam_meas_unm_1}_{Entries 185562}

Mean 0.03767 RMS 0.02611 Underflow 663 Overflow 5.062e+04

N(unm) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1