0 0.5 1 1.5 2 2.5 3 0

5000

10000

15000

20000

25000

30000

N(all) vs t0(true) (ps) : Source 0^{hNvt0_true_all_0}_{Entries 1499986}

Mean 1.046 RMS 0.8139 Underflow 0 Overflow 1.748e+05

N(all) vs t0(true) (ps) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

5000

10000

15000

20000

25000

30000

N(all) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 0^{hNvlam_true_all_0}_{Entries 1499986}

Mean 0.0329 RMS 0.02495 Underflow 0 Overflow 2.3e+05

N(all) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

5000

10000

15000

20000

25000

30000

N(all) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 0^{hNvlam_tag_all_0}_{Entries 1499986}

Mean 0.0329 RMS 0.02495 Underflow 0 Overflow 2.3e+05

N(all) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

5000

10000

15000

20000

25000

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_noK_all_0}_{Entries 1499986}

Mean 0.03399 RMS 0.02532 Underflow 0 Overflow 2.937e+05

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

5000

10000

15000

20000

25000

N(all) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 0^{hNvlam_Lm_all_0}_{Entries 1499986}

Mean 0.03298 RMS 0.02502 Underflow 4431 Overflow 2.308e+05

N(all) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

N(all) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 0^{hNvlam_meas_all_0}_{Entries 1499986}

Mean 0.03411 RMS 0.02541 Underflow 5555 Overflow 2.944e+05

N(all) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 0