0 0.5 1 1.5 2 2.5 3 0 2000

4000

6000

8000

10000

12000

14000

N(all) vs t0(true) (ps) : Source 1^{hNvt0_true_all_1}_{Entries 749931}

Mean 1.103 RMS 0.8323 Underflow 0 Overflow 1.146e+05

N(all) vs t0(true) (ps) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

N(all) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1^{hNvlam_true_all_1}_{Entries 749931}

Mean 0.03623 RMS 0.02587 Underflow 0 Overflow 1.826e+05

N(all) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

N(all) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1^{hNvlam_tag_all_1}_{Entries 749931}

Mean 0.03623 RMS 0.02587 Underflow 0 Overflow 1.826e+05

N(all) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_noK_all_1}_{Entries 749931}

Mean 0.0384 RMS 0.02638 Underflow 0 Overflow 2.54e+05

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

2000

4000

6000

8000

10000

N(all) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1^{hNvlam_Lm_all_1}_{Entries 749931}

Mean 0.03632 RMS 0.02592 Underflow 1543 Overflow 1.828e+05

N(all) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

1000

2000

3000

4000

5000

6000

7000

8000

N(all) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1^{hNvlam_meas_all_1}_{Entries 749931}

Mean 0.03854 RMS 0.02642 Underflow 2330 Overflow 2.544e+05

N(all) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1