-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10000

20000

30000

40000

50000

VPDL-true : Source - 1 - ^{VPDL-true_1_}_{Entries 749931}

Mean 0.06582 RMS 0.06424 Underflow 0 Overflow 2339

VPDL-true : Source - 1 -

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10000

20000

30000

40000

50000

VPDL-smear : Source - 1 - ^{VPDL-smear_1_}_{Entries 749931}

Mean 0.06583 RMS 0.06432 Underflow 0 Overflow 2331

VPDL-smear : Source - 1 -

0 0.01 0.02 0.03 0.04 0.05 0.06 0

50

100

150

200

250

300 3 10× sigma(VPDL) : Source - 1 - ^{VPDLerr_1_}_{Entries 749931}

Mean 0.002682 RMS 0.001764 Underflow 0 Overflow 1

sigma(VPDL) : Source - 1 -

0 5 10 15 20 25 30 35 40 45 50 0 5000

10000

15000

20000

25000

30000

35000

40000

Pt-true : Source - 1 - ^{hPtTrue_1_}_{Entries 749931}

Mean 12.33 RMS 5.255 Underflow 0 Overflow 0

Pt-true : Source - 1 -