0 0.5 1 1.5 2 2.5 3 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

N(mix) vs t0(true) (ps) : Source 1^{hNvt0_true_mix_1}_{Entries 308115}

Mean 2.059 RMS 0.6989 Underflow 0 Overflow 1.711e+05

N(mix) vs t0(true) (ps) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

N(mix) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1^{hNvlam_true_mix_1}_{Entries 308115}

Mean 0.06414 RMS 0.02045 Underflow 0 Overflow 2.234e+05

N(mix) vs lambda(Pt,Lt,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

1000

2000

3000

4000

5000

6000

7000

N(mix) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1^{hNvlam_tag_mix_1}_{Entries 572816}

Mean 0.03874 RMS 0.02666 Underflow 0 Overflow 1.989e+05

N(mix) vs lambda(Pt,Lt,Kt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

200

400

600

800

1000

1200

N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_noK_mix_1}_{Entries 308115}

Mean 0.06551 RMS 0.02019 Underflow 0 Overflow 2.554e+05

N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

N(mix) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1^{hNvlam_Lm_mix_1}_{Entries 308115}

Mean 0.06407 RMS 0.02056 Underflow 0 Overflow 2.233e+05

N(mix) vs lambda(Pt,Lm,Kt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 500 1000

1500

2000

2500

3000

3500

4000

4500

N(mix) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1^{hNvlam_meas_mix_1}_{Entries 572816}

Mean 0.04027 RMS 0.02691 Underflow 1342 Overflow 2.546e+05

N(mix) vs lambda(Pm,Lm,Km) - smear mix (cm) : Source 1