0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

100

200

300

400

500 N(mix) vs ct0(true) (cm) : Source 1^{hNvct0_true_mix_1}_{Entries 61724}

Mean 0.06146 RMS 0.021 Underflow 0 Overflow 3.437e+04

N(mix) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

100

200

300

400

500 N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_mix_1}_{Entries 61724}

Mean 0.06146 RMS 0.021 Underflow 0 Overflow 3.437e+04

N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

N(mix) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_mix_1}_{Entries 114757}

Mean 0.03675 RMS 0.02627 Underflow 0 Overflow 2.754e+04

N(mix) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 50 100 150 200 250 300 350 400 N(mix) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_mix_1}_{Entries 61724}

Mean 0.06393 RMS 0.02051 Underflow 0 Overflow 4.406e+04

N(mix) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 50 100 150 200 250 300 350 400 450 N(mix) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_mix_1}_{Entries 61724}

Mean 0.06143 RMS 0.02107 Underflow 0 Overflow 3.437e+04

N(mix) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

200

400

600

800

1000

1200

N(mix) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_mix_1}_{Entries 114757}

Mean 0.03891 RMS 0.0267 Underflow 174 Overflow 3.991e+04

N(mix) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1