-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

20000

30000

40000

50000

60000

70000

Smear - True : Source - 2 - Tag^{hSm_Tr_2_4}_{Entries 100137}

Mean -7.989e-05 RMS 0.5467 Underflow 0 Overflow 0

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0

2000

4000

6000

8000

10000

Smear - True : Source - 2 - Lxy^{hSm_Tr_2_6}_{Entries 100137}

Mean 4.213e-06 RMS 0.004385 Underflow 0 Overflow 0

Smear - True : Source - 2 - Lxy