-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

10000

15000

20000

25000

30000

35000

40000

45000

Smear - True : Source - 2 - Tag^{hSm_Tr_2_4}_{Entries 64316}

Mean -0.0006375 RMS 0.5478 Underflow 0 Overflow 0

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0

1000

2000

3000

4000

5000

6000

Smear - True : Source - 2 - Lxy^{hSm_Tr_2_6}_{Entries 64316}

Mean 2.146e-06 RMS 0.004411 Underflow 0 Overflow 0

Smear - True : Source - 2 - Lxy