-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

(true) [cm] xyL (true) [cm] xyL

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

5000

(smear) [cm] xyL (smear) [cm] xyL

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0

5000

: Smear-True xyL : Smear-True xyL

0 5 10 15 20 25 30 35 40 45 50 0 2000

4000

6000

8000

(meas) [GeV] tP (meas) [GeV] tP

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 20 40 60 80 100 120 140 3 10× Tag(smear) [cm]

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 20 40 60 80 100 120 140 160 180 200 3 10× Tag: Smear-True