-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 5000

10000

15000

20000

25000

30000

35000

VPDL-true : Source - 0 - ^{VPDL-true_0_}_{Entries 384971}

Mean 0.05019 RMS 0.05052 Underflow 0 Overflow 234

VPDL-true : Source - 0 -

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

5000

10000

15000

20000

25000

30000

VPDL-smear : Source - 0 - ^{VPDL-smear_0_}_{Entries 384971}

Mean 0.05021 RMS 0.05069 Underflow 39 Overflow 246

VPDL-smear : Source - 0 -

0 0.01 0.02 0.03 0.04 0.05 0.06 0 20 40 60 80 100 120 140 160 3 10× sigma(VPDL) : Source - 0 - ^{VPDLerr_0_}_{Entries 384971}

Mean 0.002712 RMS 0.002046 Underflow 0 Overflow 217

sigma(VPDL) : Source - 0 -

0 5 10 15 20 25 30 35 40 45 50 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

Pt-true : Source - 0 - ^{hPtTrue_0_}_{Entries 384971}

Mean 10.62 RMS 4.238 Underflow 0 Overflow 0

Pt-true : Source - 0 -