-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10000

20000

30000

40000

50000

60000

VPDL-true : Source - 2 - ^{VPDL-true_2_}_{Entries 64316}

Mean 2.168e-10 RMS 3.024e-09 Underflow 0 Overflow 0

VPDL-true : Source - 2 -

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

VPDL-smear : Source - 2 - ^{VPDL-smear_2_}_{Entries 64316}

Mean 0.0002143 RMS 0.01169 Underflow 97 Overflow 20

VPDL-smear : Source - 2 -

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

sigma(VPDL) : Source - 2 - ^{VPDLerr_2_}_{Entries 64316}

Mean 0.006372 RMS 0.006239 Underflow 0 Overflow 415

sigma(VPDL) : Source - 2 -

0 5 10 15 20 25 30 35 40 45 50 0

1000

2000

3000

4000

5000

Pt-true : Source - 2 - ^{hPtTrue_2_}_{Entries 64316}

Mean 5 RMS 3.103 Underflow 0 Overflow 0

Pt-true : Source - 2 -