-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100

120 3 10× VPDL-true : All Events - VPDL-true_all__{Entries 641612}

Mean 0.04993 RMS 0.05572 Underflow 0 Overflow 827

VPDL-true : All Events -

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10000

20000

30000

40000

50000

60000

VPDL-smear : All Events - VPDL-smear_all__{Entries 641612}

Mean 0.04997 RMS 0.05594 Underflow 136 Overflow 862

VPDL-smear : All Events -

0 0.01 0.02 0.03 0.04 0.05 0.06 0

50

100

150

200

250 3 10× sigma(VPDL) : All Events - ^{VPDLerr_all_}_{Entries 641612}

Mean 0.003068 RMS 0.002922 Underflow 0 Overflow 632

sigma(VPDL) : All Events -

0 5 10 15 20 25 30 35 40 45 50 0 5000

10000

15000

20000

25000

30000

35000

Pt-true : All Events - hPtTrue_all__{Entries 641612}

Mean 10.57 RMS 4.903 Underflow 0 Overflow 0

Pt-true : All Events -