0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

12000

N(unm) vs ct0(true) (cm) : Source 2^{hNvct0_true_unm_2}_{Entries 12173}

Mean 3e-12 RMS 1.748e-18 Underflow 0 Overflow 0

N(unm) vs ct0(true) (cm) : Source 2

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 2^{hNvlam_true_unm_2}_{Entries 12173}

Mean 2.732e-10 RMS 2.402e-09 Underflow 0 Overflow 0

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 2

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 2^{hNvlam_tag_unm_2}_{Entries 12150}

Mean 2.689e-10 RMS 2.319e-09 Underflow 0 Overflow 0

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 2

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 2^{hNvlam_noK_unm_2}_{Entries 12173}

Mean 2.732e-10 RMS 2.402e-09 Underflow 0 Overflow 0

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 2

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

200

400

600

800

1000

1200

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 2^{hNvlam_Lm_unm_2}_{Entries 12173}

Mean 0.003863 RMS 0.008929 Underflow 1758 Overflow 49

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 2

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

200

400

600

800

1000

1200

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 2^{hNvlam_meas_unm_2}_{Entries 12150}

Mean 0.00387 RMS 0.009067 Underflow 1755 Overflow 49

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 2