0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 500 1000

1500

2000

2500

3000

3500

N(mix) vs ct0(true) (cm) : Source 0^{hNvct0_true_mix_0}_{Entries 155065}

Mean 0.0387 RMS 0.02439 Underflow 0 Overflow 2.462e+04

N(mix) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 500 1000

1500

2000

2500

3000

3500

N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_mix_0}_{Entries 155065}

Mean 0.0387 RMS 0.02439 Underflow 0 Overflow 2.462e+04

N(mix) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

500

1000

1500

2000

2500

N(mix) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_mix_0}_{Entries 155357}

Mean 0.03862 RMS 0.02448 Underflow 0 Overflow 2.49e+04

N(mix) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

500

1000

1500

2000

2500

3000

N(mix) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_mix_0}_{Entries 155065}

Mean 0.04065 RMS 0.02492 Underflow 0 Overflow 3.233e+04

N(mix) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

500

1000

1500

2000

2500

3000

N(mix) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_mix_0}_{Entries 155065}

Mean 0.03882 RMS 0.02441 Underflow 79 Overflow 2.471e+04

N(mix) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(mix) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_mix_0}_{Entries 155357}

Mean 0.0407 RMS 0.02497 Underflow 130 Overflow 3.266e+04

N(mix) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0