-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -51 10× 0 2000

4000

6000

8000

10000

12000

14000

16000

Smear - True : Source - 2 - Tag^{hSm_Tr_2_3}_{Entries 24559}

Mean 0 RMS 0 Underflow 3729 Overflow 3752

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

Smear - True : Source - 2 - Lxy^{hSm_Tr_2_5}_{Entries 24559}

Mean 0.0006906 RMS 0.004758 Underflow 0 Overflow 0

Smear - True : Source - 2 - Lxy

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Smear - True : Source - 2 - VPDL^{hSm_Tr_2_8}_{Entries 24559}

Mean 0.001457 RMS 0.01128 Underflow 126 Overflow 128

Smear - True : Source - 2 - VPDL