-30 -20 -10 0 10 20 30 -33 10× 0

50

100

150

200

250

300

3 10× Smear - True : Source - 0 - Tag^{hSm_Tr_0_3}_{Entries 465292}

Mean 0 RMS 0 Underflow 6.961e+04 Overflow 7.003e+04

Smear - True : Source - 0 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Smear - True : Source - 0 - Lxy^{hSm_Tr_0_5}_{Entries 465292}

Mean 0.0001469 RMS 0.004381 Underflow 0 Overflow 0

Smear - True : Source - 0 - Lxy

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 10000

20000

30000

40000

50000

60000

70000

Smear - True : Source - 0 - VPDL^{hSm_Tr_0_8}_{Entries 465292}

Mean 0.0001265 RMS 0.003413 Underflow 102 Overflow 124

Smear - True : Source - 0 - VPDL