-30 -20 -10 0 10 20 30 -33 10× 0 10000

20000

30000

40000

50000

60000

70000

Smear - True : Source - 2 - Tag^{hSm_Tr_2_3}_{Entries 107456}

Mean 0 RMS 0 Underflow 1.615e+04 Overflow 1.638e+04

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0

2000

4000

6000

8000

10000

Smear - True : Source - 2 - Lxy^{hSm_Tr_2_5}_{Entries 107456}

Mean 1.113e-05 RMS 0.00439 Underflow 0 Overflow 0

Smear - True : Source - 2 - Lxy

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Smear - True : Source - 2 - VPDL^{hSm_Tr_2_8}_{Entries 107456}

Mean 1.066e-05 RMS 0.008898 Underflow 218 Overflow 209

Smear - True : Source - 2 - VPDL