0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

N(unm) vs ct0(true) (cm) : Source 1^{hNvct0_true_unm_1}_{Entries 1229378}

Mean 0.02889 RMS 0.01687 Underflow 0 Overflow 2.599e+05

N(unm) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_unm_1}_{Entries 1229378}

Mean 0.02889 RMS 0.01687 Underflow 0 Overflow 2.599e+05

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_unm_1}_{Entries 987958}

Mean 0.02948 RMS 0.017 Underflow 0 Overflow 2.846e+05

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_unm_1}_{Entries 1229378}

Mean 0.03095 RMS 0.01731 Underflow 0 Overflow 4.222e+05

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06

2000

4000

6000

8000

10000

12000

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_unm_1}_{Entries 1229378}

Mean 0.02898 RMS 0.01684 Underflow 1399 Overflow 2.609e+05

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06

1000

2000

3000

4000

5000

6000

7000

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_unm_1}_{Entries 987958}

Mean 0.03157 RMS 0.01735 Underflow 1519 Overflow 4.186e+05

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1