0 0.01 0.02 0.03 0.04 0.05 0.06 0

5000

10000

15000

20000

25000

N(all) vs ct0(true) (cm) : Source 0^{hNvct0_true_all_0}_{Entries 3099744}

Mean 0.02945 RMS 0.01722 Underflow 0 Overflow 9.991e+05

N(all) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0

5000

10000

15000

20000

25000

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_all_0}_{Entries 3099744}

Mean 0.02945 RMS 0.01722 Underflow 0 Overflow 9.991e+05

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0

5000

10000

15000

20000

25000

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_all_0}_{Entries 3099744}

Mean 0.02945 RMS 0.01722 Underflow 0 Overflow 9.991e+05

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_all_0}_{Entries 3099744}

Mean 0.03028 RMS 0.0174 Underflow 0 Overflow 1.185e+06

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06

5000

10000

15000

20000

25000

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_all_0}_{Entries 3099744}

Mean 0.02961 RMS 0.01719 Underflow 5706 Overflow 1.002e+06

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06

2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_all_0}_{Entries 3099744}

Mean 0.03046 RMS 0.01736 Underflow 6691 Overflow 1.189e+06

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0