0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

N(all) vs ct0(true) (cm) : Source 1^{hNvct0_true_all_1}_{Entries 1654626}

Mean 0.03017 RMS 0.01713 Underflow 0 Overflow 6.014e+05

N(all) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_all_1}_{Entries 1654626}

Mean 0.03017 RMS 0.01713 Underflow 0 Overflow 6.014e+05

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

12000

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_all_1}_{Entries 1654626}

Mean 0.03017 RMS 0.01713 Underflow 0 Overflow 6.014e+05

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0

2000

4000

6000

8000

10000

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_all_1}_{Entries 1654626}

Mean 0.03175 RMS 0.01741 Underflow 0 Overflow 8.019e+05

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06

2000

4000

6000

8000

10000

12000

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_all_1}_{Entries 1654626}

Mean 0.03025 RMS 0.0171 Underflow 1399 Overflow 6.022e+05

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06

2000

4000

6000

8000

10000

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_all_1}_{Entries 1654626}

Mean 0.03198 RMS 0.01738 Underflow 2206 Overflow 8.154e+05

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1