-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -75 10× 0

200

400

600

800

1000

1200 3 10× Smear - True : Source - 1 - Tag^{hSm_Tr_1_3}_{Entries 1654626}

Mean 0 RMS 0 Underflow 1.278e+05 Overflow 3.692e+05

Smear - True : Source - 1 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 20 40 60 80 100 120 140 160 3 10× Smear - True : Source - 1 - Lxy^{hSm_Tr_1_5}_{Entries 1654626}

Mean 0.0001101 RMS 0.004385 Underflow 0 Overflow 0

Smear - True : Source - 1 - Lxy

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0

50

100

150

200

250

3 10× Smear - True : Source - 1 - VPDL^{hSm_Tr_1_8}_{Entries 1654626}

Mean 8.756e-05 RMS 0.003212 Underflow 1 Overflow 6

Smear - True : Source - 1 - VPDL