-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -75 10× 0 20 40 60 80 100 120 140 160 180 3 10× Smear - True : Source - 2 - Tag^{hSm_Tr_2_3}_{Entries 245630}

Mean 0 RMS 0 Underflow 3.685e+04 Overflow 3.696e+04

Smear - True : Source - 2 - Tag

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

Smear - True : Source - 2 - Lxy^{hSm_Tr_2_5}_{Entries 245630}

Mean 0.000649 RMS 0.004749 Underflow 0 Overflow 0

Smear - True : Source - 2 - Lxy

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Smear - True : Source - 2 - VPDL^{hSm_Tr_2_8}_{Entries 245630}

Mean 0.001385 RMS 0.01131 Underflow 1433 Overflow 1433

Smear - True : Source - 2 - VPDL