Eff_0_9

Entries 3099744 Mean 0.1719 RMS 0.1396 Underflow 0.9932 Overflow 0.9897

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : Source - 0 - VPDLsmr Eff_1_9

Entries 1654626 Mean 0.1882 RMS 0.1278 Underflow 0 Overflow 0.9864

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

0.2

0.4

0.6

0.8

1 Eff_1_9 Eff vs VPDL : Source - 1 - VPDLsmr Eff_2_9

Entries 245630 Mean 0.1683 RMS 0.1394 Underflow 0.9926 Overflow 0.992

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

0.2

0.4

0.6

0.8

1 Eff_2_9 Eff vs VPDL : Source - 2 - VPDLsmr

Eff_all_9

Entries 5000000 Mean 0.1711 RMS 0.14 Underflow 0.9928 Overflow 0.9875

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : All Events - VPDLsmr