0 0.01 0.02 0.03 0.04 0.05 0.06 0 500 1000

1500

2000

2500

3000

3500

4000

N(unm) vs ct0(true) (cm) : Source 0^{hNvct0_true_unm_0}_{Entries 232814}

Mean 0.02943 RMS 0.01739 Underflow 0 Overflow 7.5e+04

N(unm) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0 500 1000

1500

2000

2500

3000

3500

4000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_unm_0}_{Entries 232814}

Mean 0.02943 RMS 0.01739 Underflow 0 Overflow 7.5e+04

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0

500

1000

1500

2000

2500

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_unm_0}_{Entries 232834}

Mean 0.02945 RMS 0.0173 Underflow 0 Overflow 7.494e+04

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 0

500

1000

1500

2000

2500

3000

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_unm_0}_{Entries 232814}

Mean 0.03016 RMS 0.01749 Underflow 0 Overflow 8.917e+04

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06

500

1000

1500

2000

2500

3000

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_unm_0}_{Entries 232814}

Mean 0.0296 RMS 0.0173 Underflow 599 Overflow 7.528e+04

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0.05 0.06 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_unm_0}_{Entries 232834}

Mean 0.03042 RMS 0.01738 Underflow 586 Overflow 8.936e+04

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0