0 0.01 0.02 0.03 0.04 0.05 0.06 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(all) vs ct0(true) (cm) : Source 1^{hNvct0_true_all_1}_{Entries 247959}

Mean 0.03009 RMS 0.01713 Underflow 0 Overflow 8.999e+04

N(all) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_all_1}_{Entries 247959}

Mean 0.03009 RMS 0.01713 Underflow 0 Overflow 8.999e+04

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_all_1}_{Entries 247959}

Mean 0.03009 RMS 0.01713 Underflow 0 Overflow 8.999e+04

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0 200 400 600 800 1000

1200

1400

1600

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_all_1}_{Entries 247959}

Mean 0.03171 RMS 0.01743 Underflow 0 Overflow 1.198e+05

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 200 400 600 800 1000

1200

1400

1600

1800

2000

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_all_1}_{Entries 247959}

Mean 0.03019 RMS 0.0171 Underflow 211 Overflow 9.01e+04

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 200 400 600 800 1000

1200

1400

1600

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_all_1}_{Entries 247959}

Mean 0.03192 RMS 0.01737 Underflow 339 Overflow 1.22e+05

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1