0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs ct0(true) (cm) : Source 0^{hNvct0_true_unm_0}_{Entries 155293}

Mean 0.0244 RMS 0.01397 Underflow 0 Overflow 6.688e+04

N(unm) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_unm_0}_{Entries 155293}

Mean 0.0244 RMS 0.01397 Underflow 0 Overflow 6.688e+04

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_unm_0}_{Entries 154863}

Mean 0.02438 RMS 0.0139 Underflow 0 Overflow 6.667e+04

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_unm_0}_{Entries 155293}

Mean 0.02478 RMS 0.01404 Underflow 0 Overflow 7.622e+04

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 200 400 600

800 1000

1200

1400

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_unm_0}_{Entries 155293}

Mean 0.0246 RMS 0.01387 Underflow 498 Overflow 6.703e+04

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 100 200 300 400 500 600 700 800 900 1000

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_unm_0}_{Entries 154863}

Mean 0.02501 RMS 0.01394 Underflow 483 Overflow 7.615e+04

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0