0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs ct0(true) (cm) : Source 1^{hNvct0_true_unm_1}_{Entries 122084}

Mean 0.03594 RMS 0.02346 Underflow 0 Overflow 8087

N(unm) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_unm_1}_{Entries 122084}

Mean 0.03594 RMS 0.02346 Underflow 0 Overflow 8087

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0

200

400

600

800 1000

1200

1400

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_unm_1}_{Entries 98293}

Mean 0.03768 RMS 0.02421 Underflow 0 Overflow 1.304e+04

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0 200 400 600 800 1000

1200

1400

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_unm_1}_{Entries 122084}

Mean 0.04076 RMS 0.02496 Underflow 0 Overflow 1.9e+04

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 200 400 600 800 1000

1200

1400

1600

1800

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_unm_1}_{Entries 122084}

Mean 0.03711 RMS 0.02342 Underflow 1333 Overflow 8650

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09

200

400

600

800

1000

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_unm_1}_{Entries 98293}

Mean 0.04343 RMS 0.02515 Underflow 1058 Overflow 2.417e+04

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1